Till Then (Time Stands Still)

Rick Astley

I've been away for such a long time
Every day I miss you
All those long and lonely nights
Counting the hours till I'm with youTill then I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong
(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my sideAnd the hands on the clock
Going round and round and round
But time don't seem to be moving at allEvery minute you were on my mind
Every day I wrote you
Half of me is lost in time
Half of me is always with youTill then I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong
(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my sideAnd the hands on the clock
Going round and round and round
But time don't seem to be moving at allAnother ticket for another trip to another destination
(Destination)
It's just the thought of you that keeps me strong
Moving in the right directionTill then I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong
(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my sideAnd the hands on the clock
Going round and round and round
But time don't seem to be moving at all(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my side
(Till then)
I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my side
(Till then)
I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong(Till then)
Keep our love alive, I won't be satisfied
Till you're right here by my side
(Till then)
I'll keep holding on, praying I'm not wrong
Hoping that our love is still strong

Lyrics provided by https://damnlyrics.com/