Overdrive

Katy Rose

Outta bed at the crack of noon
Blare the music and have a swoon
I can't stop thinkin of your face
La la lee la lee loo laceI'm six feet under the Bhodi Tree
With my crap new-age philosophy
Diamonds where there once were stars
I'm sittin in Jayne Mansfeild's carYea yea-a I'm independence
Yea yea-a I'm borderline
Yea yea-a I'm California
My minds all screwed and upside down
But my heart's on overdrive (yea my heart's on overdrive)I need to take a shower when I look at you
Ya sting and hurt like a bad tattoo
I wish you'd change my point of viewI cruise the canyon to get some breeze
With Hidden Treasures up my sleeve
I like the light and hate the heat
But I'll lick the blood right off your streetYea yea-a I'm cherry cola!
Yea yea-a I'm candy-eyed
Yea yea-a I'm California
My mind's all screwed and upside down
But my heart's on over driveThey all come here to find a scene
But end up girls on methadrine
Naked on a TV screen
The dreams that fall beneath my feet
Make my footsteps feel so sweet
But your kisses are my fait accompliYEA YEA- A
I'm independence
Yea-a I'm borderline
Yea-a I'm California
My mind's all screwed and up-side-down
But my heart's on overdrive
Yea my heart's on overdrive

Lyrics provided by https://damnlyrics.com/